-200 -100 0 100 200

-500

0

500

-200 -100 0 100 200

-500

0

500

-200 0 200

-500

0

500 n=8, m=24 n=16, m=48

n=32, m=96 a=100, L=300pi, mu=3.0, rho=0.0, eps=0.5, integrated up to t=5000, output every 250